
diff -r 000000000000 -r bde4ae8d615e os/graphics/windowing/windowserver/eabi/wsframerateu.DEF
--- /dev/null	Thu Jan 01 00:00:00 1970 +0000
+++ b/os/graphics/windowing/windowserver/eabi/wsframerateu.DEF	Fri Jun 15 03:10:57 2012 +0200
@@ -0,0 +1,9 @@
+EXPORTS
+	_ZN21CGraphicTestFrameRate11QueryPluginER9TAnimRate @ 1 NONAME
+	_ZN21CGraphicTestFrameRate11SetCallBackE9TCallBack @ 2 NONAME
+	_ZN21CGraphicTestFrameRate4NewLE4TUid @ 3 NONAME
+	_ZN21CGraphicTestFrameRate4NewLEi @ 4 NONAME
+	_ZN21CGraphicTestFrameRateD0Ev @ 5 NONAME
+	_ZN21CGraphicTestFrameRateD1Ev @ 6 NONAME
+	_ZN21CGraphicTestFrameRateD2Ev @ 7 NONAME
+




