
diff -r 000000000000 -r bde4ae8d615e os/graphics/windowing/windowserver/bwins/OSBWIN32U.DEF
--- /dev/null	Thu Jan 01 00:00:00 1970 +0000
+++ b/os/graphics/windowing/windowserver/bwins/OSBWIN32U.DEF	Fri Jun 15 03:10:57 2012 +0200
@@ -0,0 +1,5 @@
+EXPORTS
+	??1CDebugOsbWin@@UAE@XZ @ 1 NONAME ; CDebugOsbWin::~CDebugOsbWin(void)
+	?NewL@CDebugOsbWin@@SAPAV1@ABVTDesC16@@VTSize@@@Z @ 2 NONAME ; class CDebugOsbWin * CDebugOsbWin::NewL(class TDesC16 const &, class TSize)
+	?Refresh@CDebugOsbWin@@QAEXVTSize@@W4TDisplayMode@@PBK@Z @ 3 NONAME ; void CDebugOsbWin::Refresh(class TSize, enum TDisplayMode, unsigned long const *)
+




